(a)

(b)

Figure 7. The energy dependence of OH (

E coll

= 3.0 kcal/mol is highlighted using thick lines. The mesh plotted is spline -interpolated to yield roughly twice the number of grid points as data in each direction. Rotational distributions from (a) HCl ( � = 2, j =1), (b) HCl ( � = 2, j =6), and (c)

HCl ( � = 2, j =9) are shown. The rotational distributions at 3.0 kcal/mol bear close qualitative similarities to the experimental results of Zhang et al . [21].